0 10 20 30 40 50 60 70 80

(GeV/c)

〉_Tp〈

Raw

0.4 0.6 0.8 1 1.2 Data

PYTHIA6 Perugia0 PYTHIA6 CSC

ALICE = 7 TeV s pp @

| < 1 η Global tracks in |

0 10 20 30 40 50 60 70 80

Ratio

0.4 0.6 0.8 1 1.2 1.4 1.6 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2 η/d Nd

5.8 6 6.2 6.4 6.6 6.8 7 7.2

Average PYTHIA6 Perugia0 PYTHIA6 CSC

ALICE = 7 TeV s pp @

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Ratio

0.98

0.99 1 1.01

1.02